Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_FormComponentUtilization
{
  #keys: '[137680.1.805414542]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 507 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ChartComponentComponentUtilization
        Position { startcolumn: 507 startrow: 495 endcolumn: 507 endrow: 495 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 495 parent: 0 }
    ]
  }
  Children:
  [
    #child: ChartComponentComponentUtilization
  ]
  Properties:
  [
    Height: 551
    Image: 'GANTTCHART_OUT_RIGHT'
    IncludeInView: true
    Title: 'Component utilization'
    Tooltip: 'Utilization chart of the components in the selected run'
    Width: 816
  ]
}
