Quintiq file version 2.0
#parent: #root
Method OnOK () id:Method_DialogEditDefaultInventoryHoldingCost_OnOK
{
  #keys: '[145730.1.476582339]'
  Body:
  [*
    // Define default inventory cost
    btnOk.Enabled( false, '' );
    gp := MacroPlan.GlobalParameters_MP();
    defaultInvValue := ApplicationMacroPlanner.FormatStringToReal( EditFieldCost.Text() );
    
    // Set GP true to enable default inv holding cost
    gp.SetDefaultInventoryHolding( true,
                                   Form.GetIsCostAbsoluteValue(),
                                   DropDownListAccount.Data().Name(),
                                   defaultInvValue );
                                      
    
    Form.Close();
  *]
}
