Quintiq file version 2.0
#parent: pnlContent/ddlStockingPoint_473
Response OnSelectionChanged (
  StockingPoint_MP selection
) id:Response_pnlContent_ddlStockingPoint_OnSelectionChanged
{
  #keys: '[150660.0.942674364]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  QuillAction
  {
    Body:
    [*
      // User updates UI
      DataHolderStockingPoint.Data( selection);
      
      // Workaround: use OnSelectionChanged to re-disable during batch edit
      Form.OnUserUpdateUI( ddlProduct.Data(), selection );
    *]
    GroupServerCalls: false
  }
}
