Quintiq file version 2.0
Component PanelQuantity
{
  #keys: '[136682.1.802048342]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldQuantityUom
    {
      #keys: '[136682.1.802056401]'
      BaseType: 'WebEditField'
      Properties:
      [
        ActionLinkTooltip: 'Batch edit'
        DataBinding: 'DataHolderDialogData.Data.Quantity'
        Label: 'Quantity (uom)'
        Mask: 'REAL'
        NumberOfColumns: 33
        Taborder: 0
        Tooltip: 'To change the unit of measurement, go to the advanced tab'
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 6
  ]
}
