Quintiq file version 2.0
#parent: PanelUnitOfMeasurement/DropDownListUnitOfMeasurement
Response OnSelectionChanged (
  UnitOfMeasure_MP selection
) id:Response_PanelUnitOfMeasurement_DropDownListUnitOfMeasurement_OnSelectionChanged
{
  #keys: '[136682.1.803184675]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  GroupServerCalls: true
  QuillAction
  {
    Body:
    [*
      Form.SetDefaultUOMForLabel(selection, DropDownListCurrency.Data());
    *]
  }
}
