Quintiq file version 2.0
#parent: #root
Method OnOK () id:Method_DialogEditSCVConfiguration_OnOK
{
  #keys: '[139394.0.401104210]'
  Body:
  [*
    // OnOk
    // Disabled button to prevent the possibility of multiple firing
    btnOk.Enabled( false, '' )
    
    this.ApplyChanges();
    
    DataHolderDialogData.Data().Commit();
    DataHolderFormSCV.Data().GenerateTree();
    
    this.Close();
  *]
}
