Quintiq file version 2.0
Component PanelStockingPointCapacities
{
  #keys: '[139394.1.60882934]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldDefaultMaxCapacityPerDayForStockingPoint
    {
      #keys: '[139394.1.60882935]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'MacroPlan.GlobalParameters_MP.DefaultMaxCapacityForStockingPoint'
        Label: 'Default max capacity'
        Mask: 'REAL'
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    Taborder: 2
    Title: 'Stocking Point Capacities'
  ]
}
