Quintiq file version 2.0
Component PanelTimeCapacities
{
  #keys: '[139394.1.60884121]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DropDownListDefaultShiftPattern
    {
      #keys: '[139394.1.60887782]'
      BaseType: 'WebDropDownList'
      Databinding: 'ShiftPattern'
      Children:
      [
        Component DataExtractorShiftPattern
        {
          #keys: '[139394.1.60887784]'
          BaseType: 'WebDataExtractor'
          Properties:
          [
            DataType: 'MacroPlan'
            Source: 'MacroPlan'
            Taborder: 0
            Transformation: 'ShiftPattern'
          ]
        }
      ]
      Properties:
      [
        DataBinding: 'MacroPlan.DefaultShiftPattern'
        DisplayField: 'Name'
        Label: 'Default shift pattern'
        Taborder: 0
        Tooltip: 'The shift pattern specifies the availability of time-based units.'
      ]
    }
    Component EditFieldDefaultEfficiency
    {
      #keys: '[139394.1.60900771]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'MacroPlan.GlobalParameters_MP.DefaultEfficiency'
        Label: 'Default efficiency'
        Mask: 'REAL'
        Taborder: 1
        Tooltip: 'Multiplication factor for the efficiency of time-based resources. For example, set to 0.8 if a resource can only achieve 80% of its specified throughput.'
      ]
    }
  ]
  Properties:
  [
    Taborder: 0
    Title: 'Time Capacities'
  ]
}
