Quintiq file version 2.0
#parent: #root
Method SetDefaultValue () id:Method_DialogCreateEditOperationInputGroup_SetDefaultValue
{
  #keys: '[107654.0.1267827347]'
  Body:
  [*
    // Set the default value for the fields in the dialog
    
    data := Dialog.Data();
    
    data.InputGroupQuantity( MacroPlan.GlobalParameters_MP().DefaultOperationInputOutputQuantity() );
  *]
}
