Quintiq file version 2.0
#parent: #root
Method SetLabelLotSize () id:Method_DialogCreateEditUnit_SetLabelLotSize
{
  #keys: '[108486.0.2023083707]'
  Body:
  [*
    // Set labels lot size for different uom selection.
    
    uom := guard( SelectionUnitOfMeasurement.Data().Name(), MacroPlan.DefaultUnitOfMeasure().Name() );
    LabelMinimumQuantity.Text( Translations::MP_Designer_DialogUnit_SetLabelMinimumQuantity( uom ) );
    CheckBoxMaximumQuantity.Text( Translations::MP_Designer_DialogUnit_SetLabelMaximumQuantity( uom ) );
    LabelLotSize.Text( Translations::MP_Designer_DialogUnit_SetLabelLotSize( uom ) );
  *]
}
