Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent LibPTF_frmPTFStatus
{
  #keys: '[136682.0.314427108]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 14 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => pnl
        Position { startcolumn: 14 startrow: 15 endcolumn: 14 endrow: 15 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 15 parent: 0 }
    ]
  }
  Children:
  [
    #child: pnl
  ]
  Properties:
  [
    Height: 174
    IncludeInView: true
    InitialPlacement: 'workspace'
    Title: 'PTF status'
    Width: 641
  ]
}
