Quintiq file version 2.0
Component Toolbar
{
  #keys: '[122752.0.422839045]'
  BaseType: 'Toolbar'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 110 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ButtonLeaveDomain
        Position { startcolumn: 110 startrow: 975 endcolumn: 110 endrow: 975 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 975 parent: 0 }
    ]
  }
  Children:
  [
    Component ButtonLeaveDomain
    {
      #keys: '[122752.0.422839293]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'NODE_DELETE'
        Tooltip: 'Leave Domain without informing BootNode'
      ]
    }
  ]
  Properties:
  [
    Size: 36
  ]
}
