Quintiq file version 2.0
#parent: SelectionUnitOfMeasurement
Response OnSelectionChanged () id:Response_SelectionUnitOfMeasurement_OnSelectionChanged
{
  #keys: '[108486.0.2025204278]'
  Body:
  [*
    // Change the labels lot size for different uom
    Dialog.SetLabelLotSize();
    
    Dialog.ShowHideComponent();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUISelectionBase_OnSelectionChanged'
}
