Quintiq file version 2.0
#parent: TabPageGeneral/RadioButtonGroupCapacityType
Response OnCreated () id:Response_TabPageGeneral_RadioButtonGroupCapacityType_OnCreated
{
  #keys: '[108486.1.205747041]'
  Body:
  [*
    // Show/hide default shift pattern selector
    Dialog.SetDefaultCapacity();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
