Quintiq file version 2.0
#parent: ListImportObjectGroupNonGlobal
Response OnClickElement (
  shadow[ImportObjectGroupInDefaultProfile] element
) id:Response_ListImportObjectGroupNonGlobal_OnClickElement
{
  #keys: '[132894.0.24794289]'
  Body:
  [*
    // x is returning the x-axis of current mouse click in the list,
    // the checkbox img width spans to 8 in x-axis, thus we consider
    // the user is clicking on the checkbox if x <= 8.
    if( x <= 8 )
    {
      ApplicationLibMacroPlanner.ImportExport_ToogleIsIncluded( element,
                                                             null( shadow[UserImportProfile] ),
                                                             Dialog.Data(),
                                                             CheckBoxScenarioSpecificCheckOrUncheckAll,
                                                             null( CheckBox ) );
    }
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_List_OnClickElement'
}
