Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogNumberOfKBToKeep
{
  #keys: '[11660.0.301402215]'
  BaseType: 'Dialog'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 1 parent: 0 }
      GBFlow.Column { grow: 128 id: 3 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => Label1
        Position { startcolumn: 1 startrow: 1 endcolumn: 1 endrow: 1 }
      }
      GBElement
      {
        Component => LabelSelectedKB
        Position { startcolumn: 1 startrow: 2 endcolumn: 1 endrow: 2 }
      }
      GBElement
      {
        Component => EditorNr
        Position { startcolumn: 3 startrow: 1 endcolumn: 3 endrow: 1 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
      GBFlow.Row { grow: 0 id: 2 parent: 0 }
    ]
  }
  Children:
  [
    Component Label1
    {
      #keys: '[11660.0.301402345]'
      BaseType: 'Label'
      Properties:
      [
        FocusControl: 'EditorNr'
        NumberLines: 1
        Shortcut: 'Alt+K'
        SizePosition: 'lt17 107 20 34'
        Text: '# latest &KB to keep'
        Transparent: true
      ]
    }
    #child: EditorNr
    Component LabelSelectedKB
    {
      #keys: '[11660.0.2103430438]'
      BaseType: 'Label'
      Properties:
      [
        NumberLines: 1
        SizePosition: 'lt7 29 46 60'
        Transparent: true
        Visible: false
      ]
    }
    #child: Toolbar
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 107
    InitialPlacement: 'floating'
    Title: 'KB management'
    Width: 337
    ModeledStringList ChildOrdering
    {
      c: EditorNr
      c: Label1
      c: LabelSelectedKB
      c: Toolbar
    }
  ]
}
