Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_FormScope
{
  #keys: '[139164.0.308036251]'
  BaseType => /LibOpt_FormBase
  Databinding: 'LibOpt_Scope'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 643 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListScope
        Position { startcolumn: 643 startrow: 927 endcolumn: 643 endrow: 927 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 927 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListScope
  ]
  Properties:
  [
    Image: 'CUBES'
    IncludeInView: true
    Title: 'Scopes'
    ModeledStringList ChildOrdering
    {
      c: DataHolderPanel
      c: ListScope
    }
  ]
}
