Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_FormSuboptimizerTimeDetails
{
  #keys: '[148676.0.227132260]'
  BaseType => /LibOpt_FormBase
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 256 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListSuboptimizerTimeDetails
        Position { startcolumn: 256 startrow: 694 endcolumn: 256 endrow: 694 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 694 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListSuboptimizerTimeDetails
  ]
  Properties:
  [
    Height: 274
    Image: 'MAGIC-WAND'
    IncludeInView: true
    Title: 'Suboptimizer time details'
    Width: 799
    ModeledStringList ChildOrdering
    {
      c: DataHolderPanel
      c: ListSuboptimizerTimeDetails
    }
  ]
}
