Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent FormKPIColumns
{
  #keys: '[139544.0.987533099]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 886 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibOpt_BT_UIKPIColumn
        Position { startcolumn: 886 startrow: 962 endcolumn: 886 endrow: 962 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 962 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListLibOpt_BT_UIKPIColumn
  ]
  Properties:
  [
    Height: 486
    Image: 'EDITOR_KPI'
    IncludeInView: true
    Title: 'Select KPI columns'
    Width: 893
  ]
}
