Quintiq file version 2.0
#parent: vhDoActionInfoReturn
Response OnCreated () id:Response_LibPTF_pnlTestRunner_vhDoActionInfoReturn_OnCreated
{
  #keys: '[104342.0.785112079]'
  Body:
  [*
    // Stores the execution information after running an action
    // Values stored: <duration in milisecond>[String]
    //                + ' | ' + <is successful run action>
    //                + ' | ' + <response returned from action>
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
