Quintiq file version 2.0
#parent: #root
Method PTF_GetDurationInMilisecond (
  Real startprecisionctr
) as Real id:Method_LibPTF_pnlTestRunner_PTF_GetDurationInMilisecond
{
  #keys: '[104342.0.779723351]'
  Body:
  [*
    // Calculate the duration taken based on Precision Counters
    return ( ( OS::PrecisionCounter() - startprecisionctr ) / OS::PrecisionCounterFrequency() * 1000 ).Round( 0 );
  *]
}
