Quintiq file version 2.0
#parent: selKpiCompareLabel
Response OnSelectionChanged () id:Response_selKpiCompareLabel_OnSelectionChanged
{
  #keys: '[136398.1.973970630]'
  Body:
  [*
    // If the selection changes, and the number of labelvalues is equal to or smaller than 10,
    // just select all the Compare Values by default.
    if ( guard( this.Data().Value( relsize ), 0 ) <= 10 ) 
    {
      Form.SelectAllCompareLabelValues();
    }
    
    
    // Also recalculate the IsBest/IsWorst, to avoid people drawing the wrong
    // conclusions from stale data.
    Form.CalculateKpiRanks();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUISelectionBase_OnSelectionChanged'
}
