Quintiq file version 2.0
#parent: CheckBoxMin
Response OnChange () id:Response_FormResults_CheckBoxMin_OnChange
{
  #keys: '[145592.0.230434296]'
  Body:
  [*
    // update the rows
    FormResults.UpdateFormRows();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnChange'
}
