Quintiq file version 2.0
#parent: PanelInitSequence/ButtonHelpSequence
Response OnClick () id:Response_PanelInitSequence_ButtonHelpSequence_OnClick
{
  #keys: '[121114.1.2068021686]'
  Body:
  [*
    // OnClick for Help button (manual init step)
    
    url := DataHolderCurrentInitSequence.Data().HelpUrl();
    Application.ShowDocument( url );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    // Enable when help url is provided
    
    return guard( DataHolderCurrentInitSequence.Data().HelpUrl() <> "", false );
  *]
}
