Quintiq file version 2.0
Component pnlMaxCapacity
{
  #keys: '[415136.0.756140541]'
  BaseType: 'WebPanel'
  Children:
  [
    Component efMaxCapacity
    {
      #keys: '[415136.0.756140589]'
      BaseType: 'WebEditField'
      Properties:
      [
        Label: 'Maximum thermal trial capacity'
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    Taborder: 1
  ]
}
