Quintiq file version 2.0
#parent: chkActionDone
Response OnCreated () id:Response_LibPTF_pnlTestRunner_chkActionDone_OnCreated
{
  #keys: '[103546.0.87906237]'
  Body:
  [*
    // To serve as an indicator that the GUI is ready to execute the next action
    // Hides the checkbox
    this.Visible( false );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
