Quintiq file version 2.0
Component pnlEndOfPeriod
{
  #keys: '[146730.0.1640265267]'
  BaseType: 'WebPanel'
  Children:
  [
    #child: pnlEndLeft
    Component lblMarginLeft_11
    {
      #keys: '[146730.0.1640265278]'
      BaseType: 'WebLabel'
      Properties:
      [
        NumberOfColumns: 8
        ShowLabel: false
        Taborder: 0
      ]
    }
    #child: pnlEndRight
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 1
  ]
}
