Quintiq file version 2.0
#parent: #root
Method OnOK () id:Method_DialogCreateEditThermalTrialRatio_OnOK
{
  #keys: '[415136.0.762562093]'
  Body:
  [*
    // onOK for ProductDialog
    // When the user clicks ok,
    // we either create or edit the data
    this.ApplyChanges();
    
    data := dhDialogData.Data();
    
    newroutings := Routing::ThermalTrialRatio( data, [Number]efMaxCapacity.Text(), dsStartTime.Date(), dsEndTime.Date(), [Number]efThermalTrialRatio.Text() );
    
    ApplicationMacroPlanner.SelectListObjects( dhForm.Data().ListRoutings(), newroutings );
    
    this.Close();
  *]
}
