Quintiq file version 2.0
Component Panel346
{
  #keys: '[146874.1.173248819]'
  BaseType: 'Panel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 430 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => btnKpiSettings
        Position { startcolumn: 430 startrow: 948 endcolumn: 430 endrow: 948 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 948 parent: 0 }
    ]
  }
  Children:
  [
    Component btnKpiSettings
    {
      #keys: '[146874.1.173248869]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'GEAR'
        Tooltip: 'Open Kpi Tracker daemons settings'
      ]
    }
  ]
  Properties:
  [
    Border: true
  ]
}
