Quintiq file version 2.0
Component ListExternalSupplies
{
  #keys: '[136682.1.2075809820]'
  BaseType => //BaseFormExternalSupplies/ListExternalSupplies
  IsDerived: true
  Children:
  [
    Component DataSetLevelExternalSupplies
    {
      #keys: '[136682.1.2075809823]'
      BaseType => //BaseFormExternalSupplies/ListExternalSupplies/DataSetLevelExternalSupplies
      IsDerived: true
      Children:
      [
        #child: listContextMenuExternalSupplies
      ]
      Properties:
      [
        Columns: '[{"attribute":{"classtype":"WebApiDefinitionAttributeAllConstraint","columnid":"All constraints","title":"All constraints","subtotals":"","tooltip":"","width":1,"display":"shown"}},{"attribute":{"classtype":"WebApiDefinitionAttributeDataMember","columnid":"Date","title":"Date","subtotals":"","tooltip":"","width":-1,"display":"shown","editable":false,"attribute":"Date"}},{"attribute":{"classtype":"WebApiDefinitionAttributeDataMember","columnid":"ProductID","title":"Product","subtotals":"","tooltip":"","width":-1,"display":"shown","editable":false,"attribute":"ProductID"}},{"attribute":{"classtype":"WebApiDefinitionAttributeDataMember","columnid":"StockingPointID","title":"Stocking point","subtotals":"","tooltip":"","width":-1,"display":"shown","editable":false,"attribute":"StockingPointID"}},{"attribute":{"classtype":"WebApiDefinitionAttributeDataMember","columnid":"Quantity","title":"Quantity","subtotals":"","tooltip":"","width":-1,"display":"shown","attribute":"Quantity"}},{"attribute":{"classtype":"WebApiDefinitionAttributeDataMember","columnid":"ProductInStockingPoint_MP.UnitOfMeasureName","title":"UoM","subtotals":"","tooltip":"","width":-1,"display":"shown","attribute":"ProductInStockingPoint_MP.UnitOfMeasureName"}},{"attribute":{"classtype":"WebApiDefinitionAttributeDataMember","columnid":"Description","title":"Description","subtotals":"","tooltip":"","width":-1,"display":"shown","editable":false,"attribute":"Description"}}]'
      ]
    }
  ]
}
