Quintiq file version 2.0
Component PanelSTDLeadTime
{
  #keys: '[139394.0.1386302886]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DurationSelectorSTDLeadTime id:DurationSelectorSTDLeadTime_646
    {
      #keys: '[139394.0.1386306016]'
      BaseType: 'WebDurationSelector'
      Properties:
      [
        CanBeNegative: false
        DataBinding: 'DataHolderDialogData.Data.StandardDeviationLeadTimeOperation'
        Label: 'Standard deviation lead time'
        MinDuration: P0DT0H0M0S
        Taborder: 1
        Tooltip: 'This represents uncertainty in the lead time and is only relevant when calculation of safety stock levels is used.'
      ]
    }
    Component CheckBoxBatchEditStandardDeviation
    {
      #keys: '[136682.1.1605382164]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        Taborder: 0
        Visible: false
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 0
  ]
}
