Quintiq file version 2.0
Component PanelMaxLoadPercentage
{
  #keys: '[136682.1.1060503530]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldMaxLoadPercentage id:EditFieldMaxLoadPercentage_384
    {
      #keys: '[136682.1.1060503662]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.MaximumLoadPercentage'
        Label: 'Max load percentage'
        Mask: 'REAL'
        Taborder: 1
        Tooltip: 'The maximum allowed utilization of the unit (set to >100% to allow overloading or to <100% to restrict utilization)'
      ]
    }
    Component CheckBoxBatchEditMaxLoadPercentage
    {
      #keys: '[136682.1.1060503750]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        CheckboxType: 'toggle'
        ShowPadding: false
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 1
  ]
}
