Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent FormSupplyPlanning
{
  #keys: '[110880.8.732290736]'
  Accessibility: 'Extensible'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 519 parent: 0 }
      GBFlow.Column { grow: 128 id: 1 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => SplitterWnd1
        Position { startcolumn: 519 startrow: 1 endcolumn: 1 endrow: 1 }
      }
      GBElement
      {
        Component => ImageWarningSizing
        Position { startcolumn: 519 startrow: 620 endcolumn: 519 endrow: 620 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 620 parent: 0 }
      GBFlow.Row { grow: 128 id: 1 parent: 0 }
    ]
  }
  Children:
  [
    #child: SplitterWnd1
    Component ImageWarningSizing
    {
      #keys: '[136770.0.49618942]'
      BaseType: 'Image'
      Properties:
      [
        Image: 'WARNING'
        Tooltip: 'This form is read-only because the size of the dataset is violating the sizing parameters.<br>Please reduce the size of the dataset to regain functionality.<br>The sizing parameters can be found in Edit > Configuration > Sizing parameters.'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Height: 627
    HighlightRuleGroup: 'Supply chain planning'
    Image: 'ELEMENT_INTO'
    IncludeInView: true
    InitialPlacement: 'floating'
    Title: 'Supply planning'
    Width: 1205
    ModeledStringList ChildOrdering
    {
      c: SplitterWnd1
      c: ImageWarningSizing
    }
  ]
}
