Quintiq file version 2.0
#root
#parent: DataExchangeFramework
OrphanComponent LibDEF_FormDataExchangeDomainInspection
{
  #keys: '[122752.0.507482653]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 131 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => SplitterWndLibDEF_System_LibDEF_ChannelMeta
        Position { startcolumn: 131 startrow: 603 endcolumn: 131 endrow: 603 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 603 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    #child: SplitterWndLibDEF_System_LibDEF_ChannelMeta
  ]
  Properties:
  [
    Height: 487
    Image: 'SERVER_CLIENT_EXCHANGE'
    IncludeInView: true
    Title: 'Data Exchange Domain inspection'
    Width: 1048
    ModeledStringList ChildOrdering
    {
      c: Toolbar
      c: SplitterWndLibDEF_System_LibDEF_ChannelMeta
    }
  ]
}
