Quintiq file version 2.0
#root
#parent: DataExchangeFramework
OrphanComponent LibDEF_FormDataTransfers
{
  #keys: '[122752.0.588975331]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 940 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => SplitterWndInboxOutbox
        Position { startcolumn: 940 startrow: 379 endcolumn: 940 endrow: 379 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 379 parent: 0 }
    ]
  }
  Children:
  [
    #child: SplitterWndInboxOutbox
    #child: Toolbar
  ]
  Properties:
  [
    Height: 677
    Image: 'DATA_REPLACE'
    IncludeInView: true
    Title: 'Data transfers'
    Width: 1587
    ModeledStringList ChildOrdering
    {
      c: Toolbar
      c: SplitterWndInboxOutbox
    }
  ]
}
