Quintiq file version 2.0
#parent: PanelGroupGeneral/LabelSanityCheckHighestSeverity_715
Response OnTextChanged () id:Response_ActionBarGroupGeneral_LabelSanityCheckHighestSeverity_OnTextChanged_844
{
  #keys: '[136682.1.411667475]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebLabel_OnTextChanged'
  Precondition:
  [*
    return MacroPlan::HasMacroPlan( MacroPlan, feedback );
  *]
  QuillAction
  {
    Body:
    [*
      // Update the summary status image    
      ApplicationMacroPlanner.SetSanityCheckButtonDisplay( ButtonDoSanityCheck );
      ApplicationMacroPlanner.SetOptimizerButtonDisplay();
    *]
    GroupServerCalls: false
  }
}
