Quintiq file version 2.0
Component PanelLabelIndicatorMaxQty
{
  #keys: '[150660.2.1052203209]'
  BaseType: 'WebPanel'
  Children:
  [
    Component LabelIndicatedQuantityBasedOnMaxDuration
    {
      #keys: '[150660.2.1052203210]'
      BaseType: 'WebLabel'
      Properties:
      [
        FixedSize: false
        NumberOfColumns: 15
        ShowLabel: false
        Taborder: 0
        Tooltip: 'This indicates the quantity to be produced based on maximum duration.'
      ]
    }
  ]
  Properties:
  [
    Alignment: 'trailing'
    Orientation: 'horizontal'
    ShowActionLink: false
    Taborder: 1
  ]
}
