Quintiq file version 2.0
Component PanelMaximumQuantity
{
  #keys: '[149260.0.570912046]'
  BaseType: 'WebPanel'
  Children:
  [
    #child: PanelLabelIndicatorMax
    #child: PanelEditorMaxQty
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    ShowActionLink: false
    Taborder: 4
  ]
}
