Quintiq file version 2.0
#parent: pnlContentStockingPoint/ddlContentStockingPoint
Response OnSelectionChanged () id:Response_pnlContentStockingPoint_ddlContentStockingPoint_OnSelectionChanged
{
  #keys: '[150660.0.62564022]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  Precondition:
  [*
    // Workaround RFC66023: precondition to prevent unintended response firing.
    // Recall enable disable only in batch edit
    return DataHolderExternalSupplies.Data().Size() > 1;
  *]
  QuillAction
  {
    Body:
    [*
      // Workaround RFC66023: recall enable disable logic
      /* Disabling dropdownlist(s) during initialize was not working properly */
      isBatchEdit := DataHolderExternalSupplies.Data().Size() > 1;
      Form.EnableDisableComponent( isBatchEdit );
    *]
    GroupServerCalls: false
  }
}
