Quintiq file version 2.0
Component PanelIsLocked
{
  #keys: '[146140.0.308876440]'
  BaseType: 'WebPanel'
  Children:
  [
    Component CheckBoxIsLocked
    {
      #keys: '[146140.0.308876515]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        CheckboxType: 'toggle'
        DataBinding: 'DataHolderDialogData.Data.IsLocked'
        Label: 'Feedback is locked'
        NumberOfColumns: 40
        Taborder: 1
        Tooltip: 'A locked feedback requires optimizer to respect the exact amount while generating a plan.A unlocked feedback is the minimum threshold that the optimizer should respect while generating a plan.'
      ]
    }
    Component CheckBoxBatchEditIsLocked
    {
      #keys: '[146140.0.308876599]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        FixedSize: true
        NumberOfColumns: 2
        ShowPadding: false
        Taborder: 0
        Visible: false
      ]
    }
  ]
  Properties:
  [
    Orientation: 'horizontal'
    Taborder: 4
  ]
}
