Quintiq file version 2.0
Component PanelSafetyStock
{
  #keys: '[139394.0.1497268708]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DurationSelectorSTDLeadTime
    {
      #keys: '[139394.0.1497269773]'
      BaseType: 'WebDurationSelector'
      Properties:
      [
        CanBeNegative: false
        DataBinding: 'DataHolderDialogData.Data.StandardDeviationLeadTimeLane'
        Label: 'Standard deviation lead time'
        Taborder: 0
        Tooltip: 'This represents uncertainty in the lead time and is only relevant when calculation of safety stock levels is used.'
      ]
    }
  ]
  Properties:
  [
    Taborder: 1
  ]
}
