Quintiq file version 2.0
#parent: PanelOperationCost/DataHolderSelectedOperation
Response OnDataChanged () id:Response_PanelOperationCost_DataHolderSelectedOperation_OnDataChanged
{
  #keys: '[144528.2.74481007]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebComponent_OnDataChanged'
  QuillAction
  {
    Body:
    [*
      // Change of unit will create new shadow object
      // (Software bug, dropdownlist cannot have response else enabled/disabled will not work)
      // Workaround (Quote RfC here): disabled all response, use DataHolderSelectedUnit to source from this dropdownlist and rely on OnDataChanged
      // to replace DropDownList.OnUserChanged
      selection := this.Data();
      Form.SetShadowOperationCostRetainUserValues( selection );
      
      Form.SetCostLabel( EditFieldLengthOfTime.Text(),
                         DropDownStringListTimeUnit.Text(),
                         DropDownStringListCostDriver.Text() );
    *]
    GroupServerCalls: false
  }
}
