Quintiq file version 2.0
#parent: pnlSafetyStock/ddlStockingPoint
Response OnSelectionChanged (
  StockingPoint_MP selection
) id:Response_pnlSafetyStock_ddlStockingPoint_OnSelectionChanged
{
  #keys: '[136682.2.4697076]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  QuillAction
  {
    Body:
    [*
      // Set label
      Form.SetLabel( ddlProduct.Data(), selection );
      
      // RFC: ddl is re-enabled during batch edit
      // Workaround: recall enable/disable component
      Form.EnableBatchEditComponent();
    *]
    GroupServerCalls: false
  }
}
