Quintiq file version 2.0
#parent: pnlBatchEdit/cbBatchEditMaxCapacity
Response OnUserChanged () id:Response_pnlBatchEdit_cbBatchEditMaxCapacity_OnUserChanged
{
  #keys: '[136682.2.931314457]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebCheckbox_OnUserChanged'
  QuillAction
  {
    Body:
    [*
      //Enable disable batch edit
      Form.EnableDisableComponents( this.Checked() );
    *]
    GroupServerCalls: false
  }
}
