Quintiq file version 2.0
Component PanelBottleneckDetectionWindow id:PanelBottleneckDetectionWindow_273
{
  #keys: '[139394.1.82538675]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DurationSelectorBottleneckWindowStart
    {
      #keys: '[139394.1.82538676]'
      BaseType: 'WebDurationSelector'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.BottleneckWindowStart'
        Label: 'Start after'
        Taborder: 0
        Tooltip: 'Start of the detection window with respect to the start of the planning.'
      ]
    }
    Component DurationSelectorBottleneckWindowEnd
    {
      #keys: '[139394.1.82538677]'
      BaseType: 'WebDurationSelector'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.BottleneckWindowEnd'
        Label: 'End after'
        Taborder: 1
        Tooltip: 'End of the detection window with respect to the start of the planning.'
      ]
    }
    Component EditFieldBottleneckTolerance
    {
      #keys: '[139394.1.82538678]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.BottleneckTolerance'
        Label: 'Bottleneck tolerance (%)'
        Mask: 'REAL'
        Taborder: 2
        Tooltip: 'Units and stocking points with percentage of bottleneck periods in the detection window higher than specified tolerance are marked as bottleneck.'
      ]
    }
  ]
  Properties:
  [
    Taborder: 2
    Title: 'Bottleneck detection window'
  ]
}
