Quintiq file version 2.0
Component PanelOptimizerTuning
{
  #keys: '[144528.1.1789128197]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DurationSelectorAutoScaleFrequency
    {
      #keys: '[144528.1.1860999552]'
      BaseType: 'WebDurationSelector'
      Properties:
      [
        CanBeNegative: false
        DataBinding: 'MacroPlan.GlobalParameters_MP.AutoScalingFrequency'
        Label: 'Automatic scaling frequency'
        MinDuration: P0DT0H0M0S
        Taborder: 0
        Tooltip: 'The automatic scaling will be run at the end of the next optimizer run if the most recent automatic scaling run of the selected strategy is older than the automatic scaling frequency.'
      ]
    }
    Component EditFieldOutputNoiseTreshold
    {
      #keys: '[144528.1.1862234142]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'MacroPlan.GlobalParameters_MP.NoiseThresholdOptimizerOutput'
        Label: 'Optimizer output noise threshold'
        Mask: 'REAL'
        Taborder: 1
        Tooltip: 'Optimizer output will be set to zero if it is below this threshold'
      ]
    }
  ]
  Properties:
  [
    Taborder: 1
    Title: 'Tuning and Scaling'
  ]
}
