Quintiq file version 2.0
#parent: gtPTFKickStart
Response OnTimer () id:Response_LibPTF_pnlTestRunner_gtPTFKickStart_OnTimer
{
  #keys: '[102890.0.1880924401]'
  Body:
  [*
    // Load test script and kick start the execution
    LibPTF_pnlTestRunner.PTF_StartScriptExecution();
    gtPTFKickStart.Enabled( false );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUITimer_OnTimer'
}
