Quintiq file version 2.0
#parent: #root
Method RefreshTimeType () id:Method_FormKpiSnapshots_RefreshTimeType
{
  #keys: '[136398.1.786495077]'
  Body:
  [*
    // Makes sure the selected Time type is propagated among the loaded snapshots
    
    GlobalStateKpiTracker.RefreshTimeType( DataHolderSnapshotSetData.Data(), RadioButtonGroupTimeType.BoundValue() );
  *]
}
