Quintiq file version 2.0
#parent: #root
Method DisablePeriod (
  String feedback_i
) id:Method_LibCal_dlgEvent_DisablePeriod
{
  #keys: '[131094.0.1374231730]'
  Body:
  [*
    // Disable the controls of the recurrence period.
    // The individual controls are disabled in order to be able to give feedback on the controls themselves instead of
    // on the panel, and in order to be able to also change the colors of the lines.
    lblRecurrencePeriod.TextColor( Color::Gray() );
    lblHorizontalLine3 .TextColor( Color::LightGray() );
    
    lblStartOfPeriod.TextColor( Color::Gray() );
    datStartOfPeriod.DisableWithUserFeedback( feedback_i );
    
    ckbNoEndDate.DisableWithUserFeedback( feedback_i );
    
    ckbEndAfter       .DisableWithUserFeedback( feedback_i );
    edtNrOfOccurrences.TextColor( Color::LightGray() );  // Does not work.
    edtNrOfOccurrences.DisableWithUserFeedback( feedback_i );
    lblOccurrences    .TextColor( Color::Gray() );
    
    ckbEndBy      .DisableWithUserFeedback( feedback_i );
    datEndOfPeriod.DisableWithUserFeedback( feedback_i );
  *]
}
