Quintiq file version 2.0
Component PanelSanityCheck
{
  #keys: '[132254.0.10689263]'
  BaseType => //SCK_PanelSanityCheckBase
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 153 parent: 0 }
      GBFlow.Column { grow: 128 id: 156 parent: 0 }
      GBFlow.Column { grow: 0 id: 157 parent: 0 }
      GBFlow.Column { grow: 128 id: 154 parent: 0 }
      GBFlow.Column { grow: 0 id: 155 parent: 0 }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 301 parent: 0 }
      GBFlow.Row { grow: 128 id: 303 parent: 0 }
      GBFlow.Row { grow: 128 id: 302 parent: 0 }
    ]
  }
}
